Contents

MBR-7 DiscInfo

The display will be updated only when the update button is clicked on.  Disc information will not be automatically displayed when DiscInfo is first opened.

CD-ROM volume label information will be displayed in yellow letters. If the CD-ROM volume label is blank, CD-ROM no label will be displayed. CD audio discs are always displayed in green. If there is no disc or an unknown disc in a given tray, this will be displayed in red. An unknown disc refers to a data disc whose format is not recognized by DOS or Windows, such as a Macintosh HFS disc.

The minimize button will reduce the DiscInfo window to an icon. To restore the DiscInfo window from a minimized state, double-click on the icon.

You may wish to place DiscInfo in the startup folder so that it is automatically opened when Windows is started.